0 0.1 0.2 0.3 0.4 0.5 0 Froude number of depth

-0.5

0

0.5

1

1.5

2

Squat and clearance

Squat and clearance as a function of Fnh

f(X): -52.4085 < 53.5999

Barrass (squat) Millward (squat) Norrbin (squat) Tuck (squat) Barrass (clear) Millward (clear) Norrbin (clear) Tuck (clear)